MODE
----

Format:        MODE AUX: | PRN:
                    or
               MODE number number

Purpose:       Sets   up  printer  re-direction  and   serial 
          parameters.

Use:           If  PRN:  or  AUX:  is specified as the  first 
          parameter, then this is the device to which printer 
          output will go. Thus PRN: will cause printer output 
          to go to the parallel printer,  and AUX: will cause 
          printer  output  to  go  to  the  serial  card,  if 
          present. This allows serial printers to be used.

               If  a  device is not specified  as  the  first 
          parameter,  then the numbers specify new parameters 
          for the serial device. The first number is the baud 
          rate  and is 12 initially (1200 baud -- see below), 
          and  the second number is the serial format and  is 
          206 initially (no parity, 8 data bits, no stop bits 
          -- see below).

               The baud rate is one of the following numbers:

                    11   - 110 baud
                    15   - 150 baud
                    30   - 300 baud
                    60   - 600 baud
                    12   - 1200 baud
                    24   - 2400 baud
                    48   - 4800 baud
                    96   - 9600 baud
                    192  - 19200 baud

               The  format  number is the same as  that  used 
          from BASIC and other cassette programs, as follows:

           ---------------------------------------------
          |                           |      parity     |
          |                           | even  odd  none |
          |---------------------------+-----------------|
          | 1 stop bit    8 data bits |  126   94   78  |
          | 1 stop bit    7 data bits |  122   90   74  |
          | 2 stop bits   8 data bits |  254  222  206  |
          | 2 stop bits   7 data bits |  250  218  202  |
           ---------------------------------------------

Examples:

     MODE AUX:

               All  subsequent output to the printer will  be 
          redirected instead to the serial driver.


     MODE PRN:

               Printer to serial redirection is cancelled.


     MODE 96,122

               The baud rate is set to 9600 baud, with 1 stop 
          bit, 7 data bits and even parity.
