EXIT
----

Format:        EXIT [number]

Purpose:       Exits COMMAND.COM, the command interpreter.

Use:           EXIT  allows  the  command  interpreter  to  be 
          exited back to whatever loaded it. This will usually 
          be  another  copy of the  command  interepeter,  but 
          could be any other program.

               The  number given as a parameter to EXIT is  an 
          error  code,  and defaults to 0 (no error).  This is 
          the error code that COMMAND.COM will exit with.

               See also HELP COMMAND.

Examples:

          EXIT

          EXIT 10
