TYPE
----

Format:        TYPE device | filespec [/H]

Purpose:       Displays data from a file or device.

Use:           ASCII data is read from the file or device and 
          displayed,  ending when an end of file or control Z 
          is   read.   Non-displayable  characters  (such  as 
          control  characters)  are  converted  to   printing 
          (normal  ASCII)  characters  to  prevent  undesired 
          cursor controls etc.

               The  /H option if given indicates that it  may 
          be a hidden file that is typed.

Examples:

     TYPE MYFILE

               The contents of the file MYFILE are printed on 
          the screen.


     TYPE AUX:

               Data  is  read  from  the  serial  device  and 
          displayed on the screen.
